A probabilistic theory of measurement uncertainty

Figure 2.2: Relation between Bayesian inference and standard data analysis methods. The top-down flow shows subsequent limiting conditions. For an understanding of the relation between the ‘normal’ χ^2 and the Pearson χ^2 Ref. [24] is recommended.

32 CERN 99-03, July 1999